---
id: portal
title: Troubleshooting Portal Issues
sidebar_label: Portal Issues
custom_edit_url: https://www.internalfb.com/intern/diffusion/FBS/browsefile/master/xplat/sonar/docs/portal.mdx
---

We've found that some portal devices running Android 10 fail to connect to Flipper by default.

You can work around this by running the following on a terminal:

```
adb root
adb shell setenforce 0
```
